--------------------------------------------------------
--  DDL for Table USE_CASE
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."USE_CASE" 
   (	"ID_PROJECT" NUMBER, 
	"USE_CASE" VARCHAR2(300 BYTE), 
	"DESCRIPTION" VARCHAR2(4000 BYTE), 
	"USE_CASE_STATUS" NUMBER
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;
