--------------------------------------------------------
--  DDL for Table USER_ROLES
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."USER_ROLES" 
   (	"ID_USER" NUMBER, 
	"USER_NAME" VARCHAR2(100 BYTE), 
	"USER_MAIL" VARCHAR2(500 BYTE), 
	"ID_ROLE" NUMBER, 
	"ID_SYS_PROFILE" NUMBER, 
	"USER_STATUS" NUMBER
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;
