--------------------------------------------------------
--  DDL for Table SYS_PARAM_TEMP
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."SYS_PARAM_TEMP" 
   (	"PARAMETER_NAME" VARCHAR2(100 BYTE), 
	"PARAMETER_VALUE" VARCHAR2(4000 BYTE), 
	"ID_STATUS_PARAMETER" NUMBER, 
	"CREATION_DATE" DATE, 
	"UNIQUE_PARAM_VALUE" NUMBER, 
	"PARAMATER_FUNC_NAME" VARCHAR2(100 BYTE), 
	"PARAMETER_TYPE" NUMBER
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;
