--------------------------------------------------------
--  DDL for Table SYSTEM_PROFILE
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."SYSTEM_PROFILE" 
   (	"ID_SYS_PROFILE" NUMBER(*,0), 
	"ID_ROLE" NUMBER(*,0), 
	"SYS_PROFILE_NAME" VARCHAR2(50 BYTE), 
	"SYS_PROFILE_DESCRIPTION" VARCHAR2(200 BYTE), 
	"ID_SUP_SYS_PROFILE" NUMBER(*,0), 
	"CREATE_ENABLE" NUMBER(*,0), 
	"STATUS_PROFILE" NUMBER, 
	"IDM_DOMAIN" VARCHAR2(500 BYTE), 
	"IDM_GROUP" VARCHAR2(500 BYTE)
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;

   COMMENT ON COLUMN "ENVX_OPER"."SYSTEM_PROFILE"."ID_ROLE" IS 'Identificador del Rol';
  GRANT SELECT ON "ENVX_OPER"."SYSTEM_PROFILE" TO "ENVX_AUDIT";
