--------------------------------------------------------
--  DDL for Table SYSTEM_MESSAGE
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."SYSTEM_MESSAGE" 
   (	"ID_MESSAGE" NUMBER, 
	"ID_MESSAGE_CLASS" VARCHAR2(6 BYTE), 
	"MESSAGE_CATEGORY" NUMBER, 
	"MESSAGE_TEXT" NVARCHAR2(1000), 
	"ADDITIONAL_INFO" VARCHAR2(1000 BYTE)
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;

   COMMENT ON COLUMN "ENVX_OPER"."SYSTEM_MESSAGE"."MESSAGE_CATEGORY" IS '1- INFO 2- WARNING 3- ERROR';
  GRANT SELECT ON "ENVX_OPER"."SYSTEM_MESSAGE" TO "ENVX_AUDIT";
