--------------------------------------------------------
--  DDL for Table REQUEST_STEP_WORKFLOW
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."REQUEST_STEP_WORKFLOW" 
   (	"ID_STEP_FLOW" NUMBER(*,0), 
	"ID_REQ_FLOW" NUMBER(*,0), 
	"ID_SYS_PROFILE" NUMBER(*,0), 
	"STEP_DESCRIPTION" VARCHAR2(250 BYTE), 
	"UPDATE_ENABLE" NUMBER(*,0), 
	"DELETE_ENABLE" NUMBER(*,0), 
	"DEPLOY_ENABLE" NUMBER(*,0), 
	"SUP_ACTION_ENABLE" NUMBER(*,0), 
	"STEP_NAME" VARCHAR2(25 BYTE), 
	"STEP_ORDER" NUMBER(*,0), 
	"STEP_STATUS" NUMBER
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;

   COMMENT ON COLUMN "ENVX_OPER"."REQUEST_STEP_WORKFLOW"."ID_STEP_FLOW" IS 'Identificador ¿nico del paso en el flujo de trabajo';
   COMMENT ON COLUMN "ENVX_OPER"."REQUEST_STEP_WORKFLOW"."ID_REQ_FLOW" IS 'Identificador para el flujo de trabajo para la solicitud de despliegue';
  GRANT SELECT ON "ENVX_OPER"."REQUEST_STEP_WORKFLOW" TO "ENVX_AUDIT";
