--------------------------------------------------------
--  DDL for Table REFERENCE_SOURCE
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."REFERENCE_SOURCE" 
   (	"ID_REF_SOURCE" NUMBER(*,0), 
	"REFERENCE_SOURCE_NAME" VARCHAR2(50 BYTE), 
	"REFERENCE_URL" VARCHAR2(255 BYTE), 
	"REFERENCE_DESCRIPTION" VARCHAR2(255 BYTE)
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;
  GRANT SELECT ON "ENVX_OPER"."REFERENCE_SOURCE" TO "ENVX_AUDIT";
