--------------------------------------------------------
--  DDL for Table INTERNAL_TEST
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."INTERNAL_TEST" 
   (	"TEST_DATE" TIMESTAMP (6) DEFAULT systimestamp, 
	"TEST_RESULT" CLOB, 
	"TEST_MESSAGE" VARCHAR2(4000 BYTE), 
	"TEST_INFO" CLOB
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" 
 LOB ("TEST_RESULT") STORE AS SECUREFILE (
  TABLESPACE "APEX_3800503980117141" ENABLE STORAGE IN ROW 4000 CHUNK 8192
  NOCACHE LOGGING  NOCOMPRESS  KEEP_DUPLICATES 
  STORAGE(INITIAL 262144 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)) 
 LOB ("TEST_INFO") STORE AS SECUREFILE (
  TABLESPACE "APEX_3800503980117141" ENABLE STORAGE IN ROW 4000 CHUNK 8192
  NOCACHE LOGGING  NOCOMPRESS  KEEP_DUPLICATES 
  STORAGE(INITIAL 262144 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)) ;
