--------------------------------------------------------
--  DDL for Table EXECUTOR_PARAMETER
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."EXECUTOR_PARAMETER" 
   (	"ID_PARAMETER" NUMBER(*,0), 
	"ORDER_NUMBER" NUMBER(*,0), 
	"ID_EXECUTOR" NUMBER(*,0), 
	"FUNCTIONAL_NAME" VARCHAR2(100 BYTE), 
	"PARAMETER" VARCHAR2(100 BYTE), 
	"PARAM_SOURCE_VAL" NUMBER(*,0), 
	"DEFAULT_VALUE" VARCHAR2(4000 BYTE), 
	"IO_PARAMETER_TYPE" NUMBER(*,0)
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;

   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_PARAMETER"."ID_PARAMETER" IS 'identificador del parametro';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_PARAMETER"."ORDER_NUMBER" IS 'Orden en el cual deben devolverse los par¿metros';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_PARAMETER"."ID_EXECUTOR" IS 'Identificador del ejecutor';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_PARAMETER"."FUNCTIONAL_NAME" IS 'Nombre descriptivo del par¿metro';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_PARAMETER"."PARAMETER" IS 'Jenkins: nombre del par¿metro en el JOB';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_PARAMETER"."PARAM_SOURCE_VAL" IS '1 - Constante / 2 - Variable / 3 - Funcion';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_PARAMETER"."DEFAULT_VALUE" IS 'Jenkins: valor por defecto del par¿metro';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_PARAMETER"."IO_PARAMETER_TYPE" IS '0- INPUT / 1- OUTPUT / 2- INPUTOUTPUT';
  GRANT SELECT ON "ENVX_OPER"."EXECUTOR_PARAMETER" TO "ENVX_AUDIT";
