--------------------------------------------------------
--  DDL for Table EXECUTOR_CATEGORY
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."EXECUTOR_CATEGORY" 
   (	"ID_EXEC_CATEGORY" NUMBER(*,0), 
	"EXEC_CAT_NAME" VARCHAR2(50 BYTE), 
	"EXEC_CAT_SN" VARCHAR2(15 BYTE), 
	"EXEC_CAT_DESCRIPTION" VARCHAR2(255 BYTE), 
	"EXEC_CATEGORY_TYPE" NUMBER(*,0)
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;

   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_CATEGORY"."EXEC_CAT_NAME" IS 'NOMBRE DE LA CATEGORIA';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_CATEGORY"."EXEC_CAT_SN" IS 'NOMBRE CORTO DE LA CATEGORIA';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR_CATEGORY"."EXEC_CAT_DESCRIPTION" IS 'DESCRIPCION';
  GRANT SELECT ON "ENVX_OPER"."EXECUTOR_CATEGORY" TO "ENVX_AUDIT";
