--------------------------------------------------------
--  DDL for Table EXECUTOR
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."EXECUTOR" 
   (	"ID_EXECUTOR" NUMBER(*,0), 
	"ID_EXEC_CATEGORY" NUMBER(*,0), 
	"EXECUTOR_NAME" VARCHAR2(100 BYTE), 
	"EXECUTOR_SH" VARCHAR2(30 BYTE), 
	"EXECUTOR_DESCRIPTION" VARCHAR2(255 BYTE), 
	"EXECUTOR_TYPE" NUMBER(*,0), 
	"EXECUTOR_PROGRAM" VARCHAR2(500 BYTE)
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;

   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR"."ID_EXECUTOR" IS 'identificador ¿nico del EXECUTOR';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR"."EXECUTOR_NAME" IS 'Nombre completo que identifique al EXECUTOR asociado';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR"."EXECUTOR_SH" IS 'Nombre corto o acr¿nimo que permita la referencia r¿pida al EXECUTOR';
   COMMENT ON COLUMN "ENVX_OPER"."EXECUTOR"."EXECUTOR_TYPE" IS '0- FUNCTION / 1-PROCEDURE / 2-PKG.FUNCTION / 3-PKG.PROCEDURE';
  GRANT SELECT ON "ENVX_OPER"."EXECUTOR" TO "ENVX_AUDIT";
