--------------------------------------------------------
--  DDL for Table DEPLOYMENT_PATTERN_ENV
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."DEPLOYMENT_PATTERN_ENV" 
   (	"ID_PATTERN" NUMBER(*,0), 
	"ID_ENVIROMENT" NUMBER(*,0), 
	"ID_REPOSITORY" NUMBER, 
	"REPOSITORY_PATH" VARCHAR2(1000 BYTE), 
	"ID_DEP_PAT_ENV" NUMBER
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;
  GRANT SELECT ON "ENVX_OPER"."DEPLOYMENT_PATTERN_ENV" TO "ENVX_AUDIT";
