--------------------------------------------------------
--  DDL for Table DEPLOYMENT_PATTERN
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."DEPLOYMENT_PATTERN" 
   (	"ID_PATTERN" NUMBER(*,0), 
	"ID_DEPLOYING_TECH" NUMBER(*,0), 
	"DEPLOYMENT_PATTERN_NAME" VARCHAR2(255 BYTE), 
	"DEFAULT_PATTERN" NUMBER(1,0), 
	"DEPLOYMENT_PATTERN_DESC" VARCHAR2(255 BYTE), 
	"ID_SYS_PROFILE" NUMBER
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;

   COMMENT ON COLUMN "ENVX_OPER"."DEPLOYMENT_PATTERN"."ID_PATTERN" IS 'Identificador del Patr¿n';
   COMMENT ON COLUMN "ENVX_OPER"."DEPLOYMENT_PATTERN"."ID_DEPLOYING_TECH" IS 'Identificador de la tecnolog¿a de desarrollo';
   COMMENT ON COLUMN "ENVX_OPER"."DEPLOYMENT_PATTERN"."DEPLOYMENT_PATTERN_NAME" IS 'Nombre descriptivo para el patr¿n de despliegue';
  GRANT SELECT ON "ENVX_OPER"."DEPLOYMENT_PATTERN" TO "ENVX_AUDIT";
