--------------------------------------------------------
--  DDL for Table DEPLOYING_TECH
--------------------------------------------------------

  CREATE TABLE "ENVX_OPER"."DEPLOYING_TECH" 
   (	"ID_DEPLOYING_TECH" NUMBER(*,0), 
	"DEPLOY_TECH_NAME" VARCHAR2(255 BYTE), 
	"DEPLOY_TECH_DESCRIPTION" VARCHAR2(255 BYTE)
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" ;

   COMMENT ON COLUMN "ENVX_OPER"."DEPLOYING_TECH"."ID_DEPLOYING_TECH" IS 'Identificador de la tecnolog¿a de desarrollo';
   COMMENT ON COLUMN "ENVX_OPER"."DEPLOYING_TECH"."DEPLOY_TECH_NAME" IS 'Nombre de la tecnolog¿a de Desarrollo';
   COMMENT ON COLUMN "ENVX_OPER"."DEPLOYING_TECH"."DEPLOY_TECH_DESCRIPTION" IS 'Descripci¿n de la tecnolog¿a de Desarrollo';
  GRANT SELECT ON "ENVX_OPER"."DEPLOYING_TECH" TO "ENVX_AUDIT";
