--------------------------------------------------------
--  DDL for Sequence S_DEPLOYING_TECH_ID
--------------------------------------------------------

   CREATE SEQUENCE  "ENVX_OPER"."S_DEPLOYING_TECH_ID"  MINVALUE 1 MAXVALUE 9999999999999999999999999999 INCREMENT BY 1 START WITH 6 NOCACHE  NOORDER  NOCYCLE  NOKEEP  NOSCALE  GLOBAL ;
