--------------------------------------------------------
--  Ref Constraints for Table VERSION_REP_TECH
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."VERSION_REP_TECH" ADD CONSTRAINT "VERSION_REP_TECH_FK1" FOREIGN KEY ("ID_DEPLOYING_TECH")
	  REFERENCES "ENVX_OPER"."DEPLOYING_TECH" ("ID_DEPLOYING_TECH") ENABLE;
  ALTER TABLE "ENVX_OPER"."VERSION_REP_TECH" ADD CONSTRAINT "VERSION_REP_TECH_FK2" FOREIGN KEY ("ID_REPOSITORY")
	  REFERENCES "ENVX_OPER"."VERSION_REPOSITORY" ("ID_REPOSITORY") ENABLE;
  ALTER TABLE "ENVX_OPER"."VERSION_REP_TECH" ADD CONSTRAINT "VERSION_REP_TECH_FK3" FOREIGN KEY ("ID_ENVIROMENT_TYPE")
	  REFERENCES "ENVX_OPER"."ENVIROMENT_TYPE" ("ID_ENVIROMENT_TYPE") ENABLE;
