--------------------------------------------------------
--  Ref Constraints for Table VERSION_REPOSITORY_DET
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."VERSION_REPOSITORY_DET" ADD CONSTRAINT "VERSION_REPOSITORY_DET_FK1" FOREIGN KEY ("ID_REPOSITORY")
	  REFERENCES "ENVX_OPER"."VERSION_REPOSITORY" ("ID_REPOSITORY") ENABLE;
