--------------------------------------------------------
--  Ref Constraints for Table USE_CASE
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."USE_CASE" ADD CONSTRAINT "USE_CASE_FK1" FOREIGN KEY ("ID_PROJECT")
	  REFERENCES "ENVX_OPER"."PROJECT" ("ID_PROJECT") ENABLE;
