--------------------------------------------------------
--  Ref Constraints for Table SYSTEM_PARAMETER
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."SYSTEM_PARAMETER" ADD CONSTRAINT "SYSTEM_PARAMETER_FK1" FOREIGN KEY ("ID_PARAMETER_TYPE")
	  REFERENCES "ENVX_OPER"."SYSTEM_PARAMETER_TYPE" ("ID_PARAMETER_TYPE") ENABLE;
