--------------------------------------------------------
--  Ref Constraints for Table REQ_AUDITH
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."REQ_AUDITH" ADD CONSTRAINT "AUDITHS_REQUEST" FOREIGN KEY ("ID_REQUEST")
	  REFERENCES "ENVX_OPER"."DEPLOYMENT_REQUEST" ("ID_REQUEST") ENABLE;
