--------------------------------------------------------
--  Ref Constraints for Table REQUEST_STEP_WORKFLOW
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."REQUEST_STEP_WORKFLOW" ADD CONSTRAINT "FLW_STEPS_PROFILE" FOREIGN KEY ("ID_SYS_PROFILE")
	  REFERENCES "ENVX_OPER"."SYSTEM_PROFILE" ("ID_SYS_PROFILE") ENABLE;
  ALTER TABLE "ENVX_OPER"."REQUEST_STEP_WORKFLOW" ADD CONSTRAINT "FLW_STEPS_REQ_FLW" FOREIGN KEY ("ID_REQ_FLOW")
	  REFERENCES "ENVX_OPER"."REQUEST_WORKFLOW" ("ID_REQ_FLOW") ENABLE;
