--------------------------------------------------------
--  Ref Constraints for Table REPOSITORY_ACTION
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."REPOSITORY_ACTION" ADD CONSTRAINT "REPOSITORY_ACTION_FK1" FOREIGN KEY ("ID_REPOSITORY")
	  REFERENCES "ENVX_OPER"."VERSION_REPOSITORY" ("ID_REPOSITORY") ENABLE;
