--------------------------------------------------------
--  Ref Constraints for Table PRESET_ENV_GROUP
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."PRESET_ENV_GROUP" ADD CONSTRAINT "PRT_ENV_GROUPS_DEP_TECH" FOREIGN KEY ("ID_DEPLOYING_TECH")
	  REFERENCES "ENVX_OPER"."DEPLOYING_TECH" ("ID_DEPLOYING_TECH") ENABLE;
  ALTER TABLE "ENVX_OPER"."PRESET_ENV_GROUP" ADD CONSTRAINT "PRT_ENV_GROUPS_ENV_TYPE" FOREIGN KEY ("ID_ENVIROMENT_TYPE")
	  REFERENCES "ENVX_OPER"."ENVIROMENT_TYPE" ("ID_ENVIROMENT_TYPE") ENABLE;
