--------------------------------------------------------
--  Ref Constraints for Table EXECUTOR_PARAMETER
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."EXECUTOR_PARAMETER" ADD CONSTRAINT "PARAMETERS_EXECUTOR" FOREIGN KEY ("ID_EXECUTOR")
	  REFERENCES "ENVX_OPER"."EXECUTOR" ("ID_EXECUTOR") ENABLE;
