--------------------------------------------------------
--  Ref Constraints for Table EXECUTOR
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."EXECUTOR" ADD CONSTRAINT "EXECUTORS_CATEGORY" FOREIGN KEY ("ID_EXEC_CATEGORY")
	  REFERENCES "ENVX_OPER"."EXECUTOR_CATEGORY" ("ID_EXEC_CATEGORY") ENABLE;
