--------------------------------------------------------
--  Ref Constraints for Table DEPLOYMENT_PATTERN
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."DEPLOYMENT_PATTERN" ADD CONSTRAINT "DEP_PATTERNS_DEP_TECH" FOREIGN KEY ("ID_DEPLOYING_TECH")
	  REFERENCES "ENVX_OPER"."DEPLOYING_TECH" ("ID_DEPLOYING_TECH") ENABLE;
  ALTER TABLE "ENVX_OPER"."DEPLOYMENT_PATTERN" ADD CONSTRAINT "DEP_PATTERN_PROFILE" FOREIGN KEY ("ID_SYS_PROFILE")
	  REFERENCES "ENVX_OPER"."SYSTEM_PROFILE" ("ID_SYS_PROFILE") ENABLE;
