REM INSERTING into ENVX_OPER.USE_CASE
SET DEFINE OFF;
Insert into ENVX_OPER.USE_CASE (ID_PROJECT,USE_CASE,DESCRIPTION,USE_CASE_STATUS) values ('1','Funcionalidades de Busqueda','funcionalidades propias de la busqueda en ENVX','1');
Insert into ENVX_OPER.USE_CASE (ID_PROJECT,USE_CASE,DESCRIPTION,USE_CASE_STATUS) values ('1','Funcionalidad de seguimiento','propias del despliegue de objetos','1');
Insert into ENVX_OPER.USE_CASE (ID_PROJECT,USE_CASE,DESCRIPTION,USE_CASE_STATUS) values ('1','Funionalidad nueva','nueva','1');
