REM INSERTING into ENVX_OPER.USER_ROLES_OLD
SET DEFINE OFF;
Insert into ENVX_OPER.USER_ROLES_OLD (ID_USER,ID_ROLE,ID_SYS_PROFILE,USER_STATUS,USER_NAME,LDAP_USER,USER_MAIL) values ('28','1','1','1','admin','cn=admin,ou=CuentasdeServicio,o=Cas','admin@vatrox.com');
