REM INSERTING into ENVX_OPER.SYSTEM_ROLE
SET DEFINE OFF;
Insert into ENVX_OPER.SYSTEM_ROLE (ID_ROLE,ROLE_NAME,ROLE_DESCRIPTION,ROLE_TYPE,IDM_GROUP,ID_APEX_ROLE,IDM_DOMAIN,ROLE_STATUS) values ('1','ADMINISTRADOR','ADMINISTRADOR','1','envx-admin','22132565430760171',null,'1');
Insert into ENVX_OPER.SYSTEM_ROLE (ID_ROLE,ROLE_NAME,ROLE_DESCRIPTION,ROLE_TYPE,IDM_GROUP,ID_APEX_ROLE,IDM_DOMAIN,ROLE_STATUS) values ('2','ANALISTA','ANALISTA','1','envx-analyst','22132716139761097',null,'1');
Insert into ENVX_OPER.SYSTEM_ROLE (ID_ROLE,ROLE_NAME,ROLE_DESCRIPTION,ROLE_TYPE,IDM_GROUP,ID_APEX_ROLE,IDM_DOMAIN,ROLE_STATUS) values ('3','APROBADOR','APROBADOR','1','envx-approver','22132761600762202',null,'1');
Insert into ENVX_OPER.SYSTEM_ROLE (ID_ROLE,ROLE_NAME,ROLE_DESCRIPTION,ROLE_TYPE,IDM_GROUP,ID_APEX_ROLE,IDM_DOMAIN,ROLE_STATUS) values ('4','OPERADOR','OPERADOR','1','envx-operator','22132873625764050',null,'1');
