REM INSERTING into ENVX_OPER.SYSTEM_PROFILE
SET DEFINE OFF;
Insert into ENVX_OPER.SYSTEM_PROFILE (ID_SYS_PROFILE,ID_ROLE,SYS_PROFILE_NAME,SYS_PROFILE_DESCRIPTION,ID_SUP_SYS_PROFILE,CREATE_ENABLE,STATUS_PROFILE,IDM_DOMAIN,IDM_GROUP) values ('1','1','SuperUsuario',null,null,'1','1',null,'envx-admin');
Insert into ENVX_OPER.SYSTEM_PROFILE (ID_SYS_PROFILE,ID_ROLE,SYS_PROFILE_NAME,SYS_PROFILE_DESCRIPTION,ID_SUP_SYS_PROFILE,CREATE_ENABLE,STATUS_PROFILE,IDM_DOMAIN,IDM_GROUP) values ('2','2','SuperUsuario',null,null,'1','1',null,'envx-analyst');
Insert into ENVX_OPER.SYSTEM_PROFILE (ID_SYS_PROFILE,ID_ROLE,SYS_PROFILE_NAME,SYS_PROFILE_DESCRIPTION,ID_SUP_SYS_PROFILE,CREATE_ENABLE,STATUS_PROFILE,IDM_DOMAIN,IDM_GROUP) values ('3','3','SuperUsuario',null,null,'1','1',null,'envx-approver');
Insert into ENVX_OPER.SYSTEM_PROFILE (ID_SYS_PROFILE,ID_ROLE,SYS_PROFILE_NAME,SYS_PROFILE_DESCRIPTION,ID_SUP_SYS_PROFILE,CREATE_ENABLE,STATUS_PROFILE,IDM_DOMAIN,IDM_GROUP) values ('4','4','SuperUsuario',null,null,'1','1',null,'envx-operator');
