REM INSERTING into ENVX_OPER.PROJECT
SET DEFINE OFF;
Insert into ENVX_OPER.PROJECT (ID_PROJECT,TITTLE,PROJECT_STATUS) values ('1','ENVX','1');
Insert into ENVX_OPER.PROJECT (ID_PROJECT,TITTLE,PROJECT_STATUS) values ('2','OTRO','0');
