REM INSERTING into ENVX_OPER.EXECUTOR_PARAMETER
SET DEFINE OFF;
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('1','1','1','Categoria de accion','CATEGORY_ACTION','1','CHECKOUT','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('2','2','1','Solicitud','ID_REQUEST','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('3','3','1','Detalle de la Solicitud','ID_REQUEST_DETAIL','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('4','4','1','Nombre de Base de Datos','PARENT_ENVIROMENT_ALIAS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('5','5','1','Esquema de Base de Datos ','ENVIROMENT_ALIAS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('6','6','1','Nombre del Repositorio','REPOSITORY_ALIAS','1','GITEA_ENVX','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('7','7','1','Ubicacion del Repositorio','REPO_PATH','1','ENVX/VersionadorDES','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('8','8','1','Identificador del Objeto','ID_OBJECT','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('9','9','1','Ubicacion del Objeto','OBJECT_PATH','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('10','10','1','Nombre del Objeto','OBJECT_NAME','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('11','11','1','Tipo de Ambiente','ENVIROMENT_CLASS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('12','12','1','Timeout del build Jenkins','BUILD_TIMEOUT','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('13','1','2','Categoria de accion','CATEGORY_ACTION','1','BACKUP','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('14','2','2','Solicitud','ID_REQUEST','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('15','3','2','Detalle de la Solicitud','ID_REQUEST_DETAIL','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('16','4','2','Nombre de Base de Datos','PARENT_ENVIROMENT_ALIAS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('17','5','2','Esquema de Base de Datos ','ENVIROMENT_ALIAS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('18','6','2','Nombre del Repositorio','REPOSITORY_ALIAS','1','GITEA_ENVX','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('19','7','2','Ubicacion del Repositorio','REPO_PATH','1','ENVX/VersionadorDES','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('20','8','2','Identificador del Objeto','ID_OBJECT','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('21','9','2','Ubicacion del Objeto','OBJECT_PATH','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('22','10','2','Nombre del Objeto','OBJECT_NAME','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('23','11','2','Tipo de Ambiente','ENVIROMENT_CLASS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('24','12','2','Timeout del build Jenkins','BUILD_TIMEOUT','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('25','1','3','Categoria de accion','CATEGORY_ACTION','1','DEPLOY','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('26','2','3','Solicitud','ID_REQUEST','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('27','3','3','Detalle de la Solicitud','ID_REQUEST_DETAIL','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('28','4','3','Nombre de Base de Datos','PARENT_ENVIROMENT_ALIAS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('29','5','3','Esquema de Base de Datos ','ENVIROMENT_ALIAS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('30','6','3','Nombre del Repositorio','REPOSITORY_ALIAS','1','GITEA_ENVX','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('31','7','3','Ubicacion del Repositorio','REPO_PATH','1','ENVX/VersionadorDES','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('32','8','3','Identificador del Objeto','ID_OBJECT','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('33','9','3','Ubicacion del Objeto','OBJECT_PATH','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('34','10','3','Nombre del Objeto','OBJECT_NAME','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('35','11','3','Tipo de Ambiente','ENVIROMENT_CLASS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('36','12','3','Timeout del build Jenkins','BUILD_TIMEOUT','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('37','1','4','Categoria de accion','CATEGORY_ACTION','1','ROLLBACK','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('38','2','4','Solicitud','ID_REQUEST','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('39','3','4','Detalle de la Solicitud','ID_REQUEST_DETAIL','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('40','4','4','Nombre de Base de Datos','PARENT_ENVIROMENT_ALIAS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('41','5','4','Esquema de Base de Datos ','ENVIROMENT_ALIAS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('42','6','4','Nombre del Repositorio','REPOSITORY_ALIAS','1','GITEA_ENVX','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('43','7','4','Ubicacion del Repositorio','REPO_PATH','1','ENVX/VersionadorDES','0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('44','8','4','Identificador del Objeto','ID_OBJECT','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('45','9','4','Ubicacion del Objeto','OBJECT_PATH','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('46','10','4','Nombre del Objeto','OBJECT_NAME','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('47','11','4','Tipo de Ambiente','ENVIROMENT_CLASS','2',null,'0');
Insert into ENVX_OPER.EXECUTOR_PARAMETER (ID_PARAMETER,ORDER_NUMBER,ID_EXECUTOR,FUNCTIONAL_NAME,PARAMETER,PARAM_SOURCE_VAL,DEFAULT_VALUE,IO_PARAMETER_TYPE) values ('48','12','4','Timeout del build Jenkins','BUILD_TIMEOUT','2',null,'0');
