REM INSERTING into ENVX_OPER.DEPLOYMENT_SCHEDULE
SET DEFINE OFF;
Insert into ENVX_OPER.DEPLOYMENT_SCHEDULE (ID_SCHEDULE,ID_DEPLOYMENT_TYPE,ID_ENVIROMENT_TYPE,SCHEDULE_NAME) values ('2','3','7','Calendario de prueba');
