--------------------------------------------------------
--  Constraints for Table VERSION_REPOSITORY_DET
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."VERSION_REPOSITORY_DET" MODIFY ("ID_REPOSITORY_DET" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."VERSION_REPOSITORY_DET" ADD CONSTRAINT "VERSION_REPOSITORY_DET_PK" PRIMARY KEY ("ID_REPOSITORY_DET")
  USING INDEX PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  TABLESPACE "APEX_3800503980117141"  ENABLE;
