--------------------------------------------------------
--  Constraints for Table USE_CASE
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."USE_CASE" MODIFY ("USE_CASE" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."USE_CASE" ADD CONSTRAINT "USE_CASE_PK" PRIMARY KEY ("USE_CASE")
  USING INDEX (CREATE UNIQUE INDEX "ENVX_OPER"."TABLE1_PK" ON "ENVX_OPER"."USE_CASE" ("USE_CASE") 
  PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" )  ENABLE;
