--------------------------------------------------------
--  Constraints for Table USER_ROLES_OLD
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."USER_ROLES_OLD" ADD CONSTRAINT "USER_ROLES_UK1" UNIQUE ("USER_NAME")
  USING INDEX "ENVX_OPER"."USER_ROLES_UK1"  ENABLE;
  ALTER TABLE "ENVX_OPER"."USER_ROLES_OLD" ADD CONSTRAINT "USER_ROLES_PK" PRIMARY KEY ("ID_USER")
  USING INDEX "ENVX_OPER"."USER_ROLES_PK"  ENABLE;
  ALTER TABLE "ENVX_OPER"."USER_ROLES_OLD" MODIFY ("ID_USER" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."USER_ROLES_OLD" MODIFY ("ID_ROLE" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."USER_ROLES_OLD" MODIFY ("ID_SYS_PROFILE" NOT NULL ENABLE);
