--------------------------------------------------------
--  Constraints for Table USER_ROLES
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."USER_ROLES" ADD CONSTRAINT "USER_ROLES_UK" UNIQUE ("ID_USER", "USER_NAME", "USER_MAIL", "ID_ROLE", "ID_SYS_PROFILE")
  USING INDEX (CREATE UNIQUE INDEX "ENVX_OPER"."USER_ROLES_UK2" ON "ENVX_OPER"."USER_ROLES" ("ID_USER", "USER_NAME", "USER_MAIL", "ID_ROLE", "ID_SYS_PROFILE") 
  PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141" )  ENABLE;
  ALTER TABLE "ENVX_OPER"."USER_ROLES" MODIFY ("ID_USER" NOT NULL ENABLE);
