--------------------------------------------------------
--  Constraints for Table SYS_PARAM_TEMP
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."SYS_PARAM_TEMP" MODIFY ("PARAMETER_NAME" NOT NULL ENABLE);
