--------------------------------------------------------
--  Constraints for Table SYSTEM_ROLE
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."SYSTEM_ROLE" MODIFY ("ID_APEX_ROLE" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."SYSTEM_ROLE" MODIFY ("ID_ROLE" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."SYSTEM_ROLE" MODIFY ("IDM_GROUP" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."SYSTEM_ROLE" ADD CONSTRAINT "PK_SYSTEM_ROLE" PRIMARY KEY ("ID_ROLE")
  USING INDEX "ENVX_OPER"."PK_SYSTEM_ROLE"  ENABLE;
