--------------------------------------------------------
--  Constraints for Table SYSTEM_PROFILE
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."SYSTEM_PROFILE" MODIFY ("ID_SYS_PROFILE" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."SYSTEM_PROFILE" MODIFY ("ID_ROLE" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."SYSTEM_PROFILE" ADD CONSTRAINT "PK_SYSTEM_PROFILE" PRIMARY KEY ("ID_SYS_PROFILE")
  USING INDEX "ENVX_OPER"."PK_SYSTEM_PROFILE"  ENABLE;
