--------------------------------------------------------
--  Constraints for Table REQ_AUDITH
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."REQ_AUDITH" MODIFY ("ID_AUDITH_FLOW" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."REQ_AUDITH" MODIFY ("ID_REQUEST" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."REQ_AUDITH" ADD CONSTRAINT "PK_REQ_AUDITH" PRIMARY KEY ("ID_AUDITH_FLOW")
  USING INDEX "ENVX_OPER"."PK_REQ_AUDITH"  ENABLE;
