--------------------------------------------------------
--  Constraints for Table REQUEST_STEP_WORKFLOW
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."REQUEST_STEP_WORKFLOW" MODIFY ("ID_STEP_FLOW" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."REQUEST_STEP_WORKFLOW" MODIFY ("ID_REQ_FLOW" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."REQUEST_STEP_WORKFLOW" MODIFY ("ID_SYS_PROFILE" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."REQUEST_STEP_WORKFLOW" ADD CONSTRAINT "PK_REQUEST_STEP_FLOW" PRIMARY KEY ("ID_STEP_FLOW")
  USING INDEX "ENVX_OPER"."PK_REQUEST_STEP_FLOW"  ENABLE;
