--------------------------------------------------------
--  Constraints for Table EXECUTOR_PARAMETER
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."EXECUTOR_PARAMETER" MODIFY ("ID_PARAMETER" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."EXECUTOR_PARAMETER" MODIFY ("ORDER_NUMBER" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."EXECUTOR_PARAMETER" MODIFY ("ID_EXECUTOR" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."EXECUTOR_PARAMETER" ADD CONSTRAINT "PK_EXECUTOR_PARAMETER" PRIMARY KEY ("ID_PARAMETER", "ORDER_NUMBER")
  USING INDEX "ENVX_OPER"."PK_EXECUTOR_PARAMETER"  ENABLE;
