--------------------------------------------------------
--  Constraints for Table DEPLOYING_TECH_FILE
--------------------------------------------------------

  ALTER TABLE "ENVX_OPER"."DEPLOYING_TECH_FILE" MODIFY ("ID_DEPLOYING_TECH_FILE" NOT NULL ENABLE);
  ALTER TABLE "ENVX_OPER"."DEPLOYING_TECH_FILE" ADD CONSTRAINT "DEPLOYING_TECH_FILE_PK" PRIMARY KEY ("ID_DEPLOYING_TECH_FILE")
  USING INDEX PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "APEX_3800503980117141"  ENABLE;
